

select * from OP_WMS where WMSBASEID='D051E396-37BB-4A50-8624-392806EFAB21'

--select WMSBASEID,* from OP_WMS where WMSID='8412EB3C-A4AA-47E1-BB40-FB9A94E6EA24'

select * from OP_WMS where WMSBASEID='1C0143F2-FBAD-456A-B258-9E9B31DF3B5A'

select * from OP_WMS where CNTRNO in ('MEDU7444490','MSMU7759700')order by WMSBASEID,CreateDate

--select * from OP_WMS where CNTRNO in ('TEMU8466860','MEDU4575372')

select wmsid,wmsid_new,* from OP_WMS_TRANSFERGOODS_DETAIL where wmsid='D051E396-37BB-4A50-8624-392806EFAB21'

select wmsid,wmsid_new,* from OP_WMS_TRANSFERGOODS_DETAIL where wmsid='6430E841-EB15-4E19-843B-B5AC9181356A'

select * from temp_OP_WMS

update temp_OP_WMS set pkgs=0,kgs=0,cbm=0,storageunitcount=0,ruleunitcount=0


update temp_OP_WMS_physics set pkgs=0,kgs=0,cbm=0,storageunitcount=0,ruleunitcount=0

exec UspOutputData 'temp_OP_WMS_physics_change'



 select *  into temp_OP_WMS from op_wms 
 where wmsid in(
 'D051E396-37BB-4A50-8624-392806EFAB21',
'6430E841-EB15-4E19-843B-B5AC9181356A',
'0260C8F5-4F4D-41FB-9B5E-584E8A7A3851',
'49E96D0A-7E37-4606-AF04-2C53A61187BC',
'1C0143F2-FBAD-456A-B258-9E9B31DF3B5A',
'5D3DDB84-7869-48F3-B005-4329ED47FFB0',
'B262FF3D-848F-4F68-B2D1-6D65A5F0D423',
'8412EB3C-A4AA-47E1-BB40-FB9A94E6EA24'
 )

  select *  into temp_OP_WMS_physics from OP_WMS_PHYSICS 
 where wmsid in(
 'D051E396-37BB-4A50-8624-392806EFAB21',
'6430E841-EB15-4E19-843B-B5AC9181356A',
'0260C8F5-4F4D-41FB-9B5E-584E8A7A3851',
'49E96D0A-7E37-4606-AF04-2C53A61187BC',
'1C0143F2-FBAD-456A-B258-9E9B31DF3B5A',
'5D3DDB84-7869-48F3-B005-4329ED47FFB0',
'B262FF3D-848F-4F68-B2D1-6D65A5F0D423',
'8412EB3C-A4AA-47E1-BB40-FB9A94E6EA24'
 )

   select *  into temp_OP_WMS_change from OP_WMS_change
 where wmsid in(
 'D051E396-37BB-4A50-8624-392806EFAB21',
'6430E841-EB15-4E19-843B-B5AC9181356A',
'0260C8F5-4F4D-41FB-9B5E-584E8A7A3851',
'49E96D0A-7E37-4606-AF04-2C53A61187BC',
'1C0143F2-FBAD-456A-B258-9E9B31DF3B5A',
'5D3DDB84-7869-48F3-B005-4329ED47FFB0',
'B262FF3D-848F-4F68-B2D1-6D65A5F0D423',
'8412EB3C-A4AA-47E1-BB40-FB9A94E6EA24'
 )

    select *  into temp_OP_WMS_physics_change from OP_WMS_physics_change
 where wmsid in(
 'D051E396-37BB-4A50-8624-392806EFAB21',
'6430E841-EB15-4E19-843B-B5AC9181356A',
'0260C8F5-4F4D-41FB-9B5E-584E8A7A3851',
'49E96D0A-7E37-4606-AF04-2C53A61187BC',
'1C0143F2-FBAD-456A-B258-9E9B31DF3B5A',
'5D3DDB84-7869-48F3-B005-4329ED47FFB0',
'B262FF3D-848F-4F68-B2D1-6D65A5F0D423',
'8412EB3C-A4AA-47E1-BB40-FB9A94E6EA24'
 )
